Cable-Knit Round Neck Sweater Dress

Vendor: Trendsi
Type:
Price: 50.24

Features: Cable-Knit

Stretch: Slightly stretchy

Material composition: 100% polyester

Care instructions: Machine wash cold. Tumble dry low.

Imported

Product Measurements (Measurements by inches) & Size Conversion

Size | US | Bust | Shoulder | Sleeve Length | Hip | Length
S | 4 | 42.5 | 22.4 | 21.7 | 38.2 | 31.9
M | 6/8 | 44.9 | 23.6 | 21.7 | 40.6 | 32.7
L | 10/12 | 47.2 | 24.8 | 21.7 | 42.9 | 33.5
XL | 14/16 | 50.4 | 26.4 | 21.7 | 46.1 | 34.3